
    BACKUP LOGS

    This window contains the following buttons:

    View

    Click on this button to view the selected backup logs.

    Delete

    Click on this button to delete the selected backup logs. Enlighten
    will prompt you to confirm your action.

    Print Log

    Click on this button to print a copy of the selected backup logs.
    The output is sent to the printer defined in the Print field in the
    Configure --> Session Preferences window. See "Session Preferences"
    on page 2-2 for further information.

